### New bot walking settings

INSERT INTO `emulator_settings` (`key`, `value`) VALUES ('hotel.bot.limit.walking.distance', '1');
INSERT INTO `emulator_settings` (`key`, `value`) VALUES ('hotel.bot.limit.walking.distance.radius', '5');