import { FC, useEffect, useState } from 'react';
import { GetWiredTimeLocale, LocalizeText, WiredFurniType } from '../../../../api';
import { Slider, Text } from '../../../../common';
import { useWired } from '../../../../hooks';
import { WiredTriggerBaseView } from './WiredTriggerBaseView';

export const WiredTriggeExecutePeriodicallyView: FC<{}> = props =>
{
    const [ time, setTime ] = useState(1);
    const { trigger = null, setIntParams = null } = useWired();

    const save = () => setIntParams([ time ]);

    useEffect(() =>
    {
        setTime((trigger.intData.length > 0) ? trigger.intData[0] : 0);
    }, [ trigger ]);

    return (
        <WiredTriggerBaseView hasSpecialInput={ true } requiresFurni={ WiredFurniType.STUFF_SELECTION_OPTION_NONE } save={ save }>
            <div className="flex flex-col gap-1">
                <Text bold>{ LocalizeText('wiredfurni.params.settime', [ 'seconds' ], [ GetWiredTimeLocale(time) ]) }</Text>
                <Slider
                    max={ 60 }
                    min={ 1 }
                    value={ time }
                    onChange={ event => setTime(event) } />
            </div>
        </WiredTriggerBaseView>
    );
};
